%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Tarkhov_etal2008} Tarkhov, M., Claudon, J., Poizat, J. P., Korneev, A., Divochiy, A., Minaeva, O., et al. (2008). Ultrafast reset time of superconducting single photon detectors. \textit{Appl. Phys. Lett.}, \textit{92}(24), 241112 (1 to 3).

\end{thebibliography}

\end{document}

