%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Tonguz+Hwang1993} Tonguz, O. K., \& Hwang, B. (1993). Noise performance of AFC loops in optical heterodyne receivers. In \textit{Proc. Lasers and Electro-Optics Society Annual Meeting} (pp. 361--362). San Jose, CA, USA.

\end{thebibliography}

\end{document}

