%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Freer_etal2010} Freer, E. M., Grachev, O., Duan, X., Martin, S., \& Stumbo, D. P. (2010). High-yield self-limiting single-nanowire assembly with dielectrophoresis. \textit{Nat. Nanotech.}, \textit{5}(7), 525--530.

\end{thebibliography}

\end{document}

