%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Venkatasubramanian_etal2009} Venkatasubramanian, C., Cabarcos, O. M., Allara, D. L. H., Mark W., \& Ashok, S. (2009). Correlation of temperature response and structure of annealed VOx thin films for IR detector applications. \textit{J. Vac. Sci. Technol. A}, \textit{27}(4), 6.

\end{thebibliography}

\end{document}

