%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Yates_etal2009} Yates, S. J. C., Baryshev, A. M., Baselmans, J. J. A., Klein, B., \& G{\"u}sten, R. (2009). Fast Fourier transform spectrometer readout for large arrays of microwave kinetic inductance detectors. \textit{Appl. Phys. Lett.}, \textit{95}(4), 3.

\end{thebibliography}

\end{document}

