%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Korneev_etal2017} Korneev, A., Kovalyuk, V., Ferrari, S., Kahl, O., Pernice, W., An, P., et al. (2017). Superconducting Single-Photon Detectors for Integrated Nanophotonics Circuits. In \textit{16th ISEC} (pp. 1--3).

\end{thebibliography}

\end{document}

