%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Shcherbatenko_etal2017} Shcherbatenko, M., Lobanov, Y., Semenov, A., Kovalyuk, V., Korneev, A., Ozhegov, R., et al. (2017). Coherent detection of weak signals with superconducting nanowire single photon detector at the telecommunication wavelength. In I. Prochazka, R. Sobolewski, \& R. B. James (Eds.), \textit{Proc. SPIE} (Vol. 10229, 0G (1 to 12)). Spie.

\end{thebibliography}

\end{document}

