%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Shcherbatenko_etal2016} Shcherbatenko, M., Lobanov, Y., Kovalyuk, V., Korneev, A., \& Gol{\textquoteright}tsman, G. N. (2016). Photon counting detector as a mixer with picowatt local oscillator power requirement. In \textit{Proc. 27$^{th}$ Int. Symp. Space Terahertz Technol.} (110).

\end{thebibliography}

\end{document}

