%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Goltsman2019} Goltsman, G. (2019). Quantum-photonic integrated circuits. In \textit{Proc. IWQO} (pp. 22--23).

\end{thebibliography}

\end{document}

