%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Zhang_etal2014} Zhang, W., Miao, W., Zhong, J. Q., Shi, S. C., Hayton, D. J., Vercruyssen, N., et al. (2014). Temperature dependence of the receiver noise temperature and IF bandwidth of superconducting hot electron bolometer mixers. \textit{Supercond. Sci. Technol.}, \textit{27}(8), 085013 (1 to 5).

\end{thebibliography}

\end{document}

