%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Shurakov_etal2014} Shurakov, A., Tong, C. -yu E., Blundell, R., \& Gol{\textquoteright}tsman, G. (2014). A microwave pumped HEB direct detector using a homodyne readout scheme. In \textit{Proc. 25$^{th}$ Int. Symp. Space Terahertz Technol.} (129).

\end{thebibliography}

\end{document}

