%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Kerman_etal2007} Kerman, A. J., Dauler, E. A., Yang, J. K. W., Rosfjord, K. M., Anant, V., Berggren, K. K., et al. (2007). Constriction-limited detection efficiency of superconducting nanowire single-photon detectors. \textit{Appl. Phys. Lett.}, \textit{90}(10), 101110 (1 to 3).

\end{thebibliography}

\end{document}

