%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Dauler_etal2006} Dauler, E. A., Kerman, A. J., Robinson, B. S., Yang, J. K. W., Voronov, B. M., Gol{\textquoteright}tsman, G. N., et al. (2006). Achieving high counting rates in superconducting nanowire single-photon detectors. In \textit{CLEO/QELS} (JTuD3 (1 to 2)). Optical Society of America.

\end{thebibliography}

\end{document}

