%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Semenov_etal1997} Semenov, A. D., Gousev, Y. P., Renk, K. F., Voronov, B. M., Gol{\textquoteright}tsman, G. N., Gershenzon, E. M., et al. (1997). Noise characteristics of a NbN hot-electron mixer at 2.5 THz. \textit{IEEE Trans. Appl. Supercond.}, \textit{7}(2), 3572--3575.

\end{thebibliography}

\end{document}

