%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Polyakova_etal2020} Polyakova, M. I., Korneev, A. A., \& Semenov, A. V. (2020). Comparison single- and double- spot detection efficiencies of SSPD based to MoSi and NbN films. In \textit{J. Phys.: Conf. Ser.} (Vol. 1695, 012146 (1 to 3)).

\end{thebibliography}

\end{document}

