%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Arams_etal1966} Arams, F., Allen, C., Peyton, B., \& Sard, E. (1966). Millimeter mixing and detection in bulk InSb. In \textit{Proc. IEEE} (Vol. 54, pp. 612--622).

\end{thebibliography}

\end{document}

