%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Rosfjord_etal2006} Rosfjord, K. M., Yang, J. K. W., Dauler, E. A., Kerman, A. J., Vikas Anant, Voronov, B. M., et al. (2006). Nanowire Single-photon detector with an integrated optical cavity and anti-reflection coating. \textit{Opt. Express}, \textit{14}(2), 527--534.

\end{thebibliography}

\end{document}

