%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Cherednichenko_etal2007} Cherednichenko, S., Drakinskiy, V., Baubert, J., Krieg, J. - M., Voronov, B., Gol{\textquoteright}tsman, G., et al. (2007). Gain bandwidth of NbN hot-electron bolometer terahertz mixers on 1.5~μm Si$_{3}$N$_{4}$~/~SiO$_{2}$ membranes. \textit{J. Appl. Phys.}, \textit{101}(12), 124508 (1 to 6).

\end{thebibliography}

\end{document}

