%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Lobanov_etal2010} Lobanov, Y. V., Tong, C. - Y. E., Hedden, A. S., Blundell, R., \& Gol{\textquoteright}tsman, G. N. (2010). Microwave-assisted슠measurement슠of the슠frequency슠response슠of슠terahertz슠HEB슠mixers슠with a슠fourier슠transform슠spectrometer. In \textit{21st International Symposium on Space Terahertz Technology} (pp. 420--423).

\end{thebibliography}

\end{document}

