%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Hoevers_etal2000} Hoevers, H. F. C., Bento, A. C., Bruijn, M. P., Gottardi, L., Korevaar, M. A. N., Mels, W. A., et al. (2000). Thermal fluctuation noise in a voltage biased superconducting transition edge thermometer. \textit{Appl. Phys. Lett.}, \textit{77}(26), 4421--4424.

\end{thebibliography}

\end{document}

