%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Benford_etal2009} Benford, D., Moseley, H., \& Zmuidzinas, J. (2009). Direct detectors for the Einstein inflation probe. In \textit{J. Phys.: Conf. Ser.} (Vol. 155, 012001 (1 to 49)).

\end{thebibliography}

\end{document}

