%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Miao_etal2014} Miao, W., Zhang, W., Zhong, J. Q., Shi, S. C., Delorme, Y., Lefevre, R., et al. (2014). Non-uniform absorption of terahertz radiation on superconducting hot electron bolometer microbridges. \textit{<ef><bf><bc>Appl. Phys. Lett.}, \textit{104}, 052605(1--4).

\end{thebibliography}

\end{document}

