%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Prober1993} Prober, D. E. (1993). Superconducting terahertz mixer using a transition-edge microbolometer. \textit{Department of Applied Physics and Physics, Yale University, New Haven, Connecticut 06520-2157}, , 2119--2121.

\end{thebibliography}

\end{document}

