%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Goltsman_etal2010} Goltsman, G. N., Korneev, A. A., Finkel, M. I., Divochiy, A. V., Florya, I. N., Korneeva, Y. P., et al. (2010). Superconducting hot-electron bolometer as THz mixer, direct detector and IR single-photon counter. In \textit{35th Int. Conf. Infrared, Millimeter, and Terahertz Waves} (p. 1).

\end{thebibliography}

\end{document}

