%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Rath_etal2016} Rath, P., Vetter, A., Kovalyuk, V., Ferrari, S., Kahl, O., Nebel, C., et al. (2016). Travelling-wave single-photon detectors integrated with diamond photonic circuits: operation at visible and telecom wavelengths with a timing jitter down to 23 ps. In J. - E. Broquin, \& G. N. Conti (Eds.), \textit{Integrated Optics: Devices, Mat. Technol. XX} (Vol. 9750, pp. 135--142). Spie.

\end{thebibliography}

\end{document}

