%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Svechnikov_etal2006} Svechnikov, S. I., Finkel, M. I., Maslennikov, S. N., Vachtomin, Y. B., Smirnov, K. V., Seleznev, V. A., et al. (2006). Superconducting hot electron bolometer mixer for middle IR range. In \textit{Proc. 16th Int. Crimean Microwave and Telecommunication Technology} (Vol. 2, pp. 686--687).

\end{thebibliography}

\end{document}

