%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Smirnov_etal2006} Smirnov, K., Korneev, A., Minaeva, O., Divochij, A., Rubtsova, I., Antipov, A., et al. (2006). Superconducting single-photon detector for near- and middle IR wavelength range. In \textit{Proc. 16th Int. Crimean Microwave and Telecommunication Technology} (Vol. 2, pp. 684--685).

\end{thebibliography}

\end{document}

