%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Nebosis_etal1992} Nebosis, R. S., Steinke, R., Lang, P. T., Schatz, W., Heusinger, M. A., Renk, K. F., et al. (1992). Picosecond YBa$_{2}$Cu$_{3}$O$_{7-δ}$detector for far-infrared radiation. \textit{J. Appl. Phys.}, \textit{72}(11), 5496--5499.

\end{thebibliography}

\end{document}

