%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Crowe_etal1992} Crowe, T. W., Mattauch, R. J., Roser, H. P., Bishop, W. L., Peatman, W. C. B., \& Liu, X. (1992). GaAs Schottky diodes for THz mixing applications. In \textit{Proc. IEEE} (Vol. 80, pp. 1827--1841).

\end{thebibliography}

\end{document}

