%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Hsiao_etal2001} Hsiao, F. Z., Lin, M. C., Wang, C., Lee, D. S., Chen, J. R., Hilbert, B., et al. (2001). The liquid helium cryogenic system for the superconducting cavity in SRRC. In \textit{Proc. Particle Accelerator Conference} (Vol. 2, pp. 1604--1606).

\end{thebibliography}

\end{document}

