%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Thiebeau_etal1988} Thi{\'e}beau, C., Courtois, D., Delahaigue, A., Corre, H., Mouanda, J. C., \& Fayt, A. (1988). Dual-beam laser heterodyne spectrometer: Ethylene absorption spectrum in the 10 $\mu$m range. \textit{Appl. Phys. B}, \textit{47}(4), 313--318.

\end{thebibliography}

\end{document}

