%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Goltsman_etal2005} Goltsman, G. N., Vachtomin, Y. B., Antipov, S. V., Finkel, M. I., Maslennikov, S. N., Polyakov, S. L., et al. (2005). Low-noise NbN phonon-cooled hot-electron bolometer mixers for terahertz heterodyne receivers. In \textit{Proc. 9-th WMSCI} (Vol. 9, pp. 154--159). International Institute of Informatics and Systemics.

\end{thebibliography}

\end{document}

