%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Lobanov_etal2015} Lobanov, Y., Shcherbatenko, M., Finkel, M., Maslennikov, S., Semenov, A., Voronov, B. M., et al. (2015). NbN hot-electron-bolometer mixer for operation in the near-IR frequency range. \textit{IEEE Trans. Appl. Supercond.}, \textit{25}(3), 2300704 (1 to 4).

\end{thebibliography}

\end{document}

