%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Krause_etal2017} Krause, S., Mityashkin, V., Antipov, S., Gol{\textquoteright}tsman, G., Meledin, D., Desmaris, V., et al. (2017). Reduction of phonon escape time for nbn hot electron bolometers by using gan buffer layers. \textit{IEEE Trans. Terahertz Sci. Technol.}, \textit{7}(1), 53--59.

\end{thebibliography}

\end{document}

