%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{Cherednichenko_etal1999} Cherednichenko, S., Ronnung, F., Gol{\textquoteright}tsman, G., Gershenzon, E., \& Winkler, D. (1999). YBa$_{2}$Cu$_{3}$O$_{7-δ}$ hot-electron bolometer with submicron dimensions. In \textit{Proc. 10$^{th}$ Int. Symp. Space Terahertz Technol.} (pp. 181--189).

\end{thebibliography}

\end{document}

