%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{5}

\bibitem{AlexandreKarpov_etal2004} Alexandre Karpov, David Miller, Rice, F. R., Stern, J. A., Bruce Bumble, LeDuc, H. G., et al. (2004). Low-noise SIS mixer for far-infrared radio astronomy. In \textit{Proc. SPIE} (Vol. 5498, pp. 616--621). Glasgow, Scotland, UK.

\end{thebibliography}

\end{document}

